\documentclass[a4paper,10pt]{report}
\usepackage[utf8x]{inputenc}

% Title Page
\title{}
\author{}


\begin{document}
\maketitle

\begin{abstract}
\end{abstract}
\section{Application name}
Short description goes here
\subsection{Type of analysis}
Is it an on-line, in-time, off-line analysis?
Does it need anyway a reprocessing stage, even if it is an online analysis?
\subsection{Location and Environment}
Cascina, Lyon, CNAF, LSC clusters
Standard VCS env? Commercial or non commercial software 
\subsection{Technical information}
\begin{itemize}
\item Data access (input/bandwidth)
\item Latency of the analysis
\item Input data	
\item Output data	
\item Output volume	
\item Receiving LIGO data	
\item Use of special service	
\item Processes number / duration [fraction of day]	
\item Cores number / type	
\item RAM	
\item Need of batch scheduler at cascina?/ type of implementation	
\item Reprocessing possibility / which data stream?	
\item Commissioning / detector operation	
\item Comments
\end{itemize}
\end{document}          
